\begin{table*}[ht]
\centering
\caption{Fisher $1\sigma$ uncertainties on $H_0$ from GW memory. The column $N=100$ gives the direct Fisher constraint from a dedicated run restricted to $d_{L,\mathrm{near}}=100$\,events (marked $^\star$); it is only shown for those rows and is left blank for full-volume runs where such scaling would be misleading. $N_\mathrm{lo}$ and $N_\mathrm{hi}$ are the expected total detections over the full detectable volume at the low and high merger rate bounds (shown only for full-volume runs). Each cell shows mean\,$\pm$\,population scatter\,($\sigma_\mathrm{pop}$) with Monte Carlo error in parentheses.}
\label{tab:sigma_H0_combined}
\begin{tabular}{lrrrrccc}
\toprule
Detector & $N_\mathrm{samp}$ & $M_\mathrm{min}$ & $M_\mathrm{max}$ & Approx. & \multicolumn{3}{c}{$\sigma_{H_0}$ [km\,s$^{-1}$\,Mpc$^{-1}$]} \\
\cmidrule(r){1-5}\cmidrule(lr){6-8}
 &  & [$M_\odot$] & [$M_\odot$] &  & $N=100$ & $N_\mathrm{lo}$ & $N_\mathrm{hi}$ \\
\midrule
\multicolumn{8}{l}{\textit{LISA (light seeds)}} \\
 & 16384 & 10000 & $10^{6}$ & MWM$^\dagger$ & -- & 810.2 & 181.2 \\
\midrule
\multicolumn{8}{l}{\textit{LISA (heavy seeds)}} \\
 & 16384 & $10^{6}$ & $10^{8}$ & MWM$^\dagger$ & -- & -- & -- \\
 & 32768 & $10^{6}$ & $10^{8}$ & MWM$^\dagger$ & -- & -- & -- \\
\bottomrule
\end{tabular}
\begin{minipage}{\linewidth}
\smallskip\small
\textit{Notes:} $^\dagger$ MWM waveform with NRSur7dq2 prior bounds ($q\geq0.5$, $|\chi|\leq0.8$). $^\star$ Direct Fisher result for nearby-only population ($d_L \leq d_{L,\mathrm{near}}$); no $\sqrt{N}$ scaling applied.
\end{minipage}
\end{table*}