\documentclass{article}
\usepackage{textcmds}
\usepackage{../aas_macros}
\usepackage[margin=2cm]{geometry}
\renewcommand{\rmdefault}{phv}
\renewcommand{\sfdefault}{phv}
\begin{document}
\nocite{*}
\bibliographystyle{../plainyr-rev}
\bibliography{my_publications}
\end{document}
